/*
 Navicat Premium Data Transfer

 Source Server         : conpany 102
 Source Server Type    : MySQL
 Source Server Version : 80020 (8.0.20)
 Source Host           : 192.168.12.102:3306
 Source Schema         : wx

 Target Server Type    : MySQL
 Target Server Version : 80020 (8.0.20)
 File Encoding         : 65001

 Date: 15/09/2023 15:20:54
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for report
-- ----------------------------
DROP TABLE IF EXISTS `report`;
CREATE TABLE `report` (
  `ReportId` int NOT NULL AUTO_INCREMENT,
  `UpdateTime` date DEFAULT NULL,
  `ReportCount` int DEFAULT NULL,
  `ReportType` varchar(200) CHARACTER SET utf8 COLLATE utf8_general_ci DEFAULT NULL,
  `Remark` varchar(500) DEFAULT NULL,
  PRIMARY KEY (`ReportId`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

SET FOREIGN_KEY_CHECKS = 1;
