/*
 Navicat Premium Data Transfer

 Source Server         : localhost mysql
 Source Server Type    : MySQL
 Source Server Version : 80033 (8.0.33)
 Source Host           : localhost:3306
 Source Schema         : ynxbd_wx

 Target Server Type    : MySQL
 Target Server Version : 80033 (8.0.33)
 File Encoding         : 65001

 Date: 16/08/2023 17:13:25
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for dict_chronic
-- ----------------------------
DROP TABLE IF EXISTS `dict_chronic`;
CREATE TABLE `dict_chronic` (
  `ChronicId` int NOT NULL AUTO_INCREMENT,
  `ChronicName` varchar(200) DEFAULT NULL,
  `ChronicTip` varchar(500) DEFAULT NULL,
  `ChronicType` int DEFAULT NULL COMMENT '门诊/住院\n1.门诊\n2.住院',
  PRIMARY KEY (`ChronicId`)
) ENGINE=InnoDB AUTO_INCREMENT=5 DEFAULT CHARSET=utf8mb3;

-- ----------------------------
-- Records of dict_chronic
-- ----------------------------
BEGIN;
INSERT INTO `dict_chronic` (`ChronicId`, `ChronicName`, `ChronicTip`, `ChronicType`) VALUES (1, '高血压', NULL, 1);
INSERT INTO `dict_chronic` (`ChronicId`, `ChronicName`, `ChronicTip`, `ChronicType`) VALUES (2, '肝炎', NULL, 1);
INSERT INTO `dict_chronic` (`ChronicId`, `ChronicName`, `ChronicTip`, `ChronicType`) VALUES (3, '抑郁症', NULL, 1);
INSERT INTO `dict_chronic` (`ChronicId`, `ChronicName`, `ChronicTip`, `ChronicType`) VALUES (4, '甲亢', NULL, 1);
COMMIT;

SET FOREIGN_KEY_CHECKS = 1;
